1 2 3 4 5 6 7 8 20 40 60 80 100 120 140 160 180 200 220 Peak Mflop/s on Xolas0.lcs.mit.edu: o (total), + (per process(or))

Number of process(or)s "fork"ed in one box

Mflop/s