10^{-4} 10^{-3} 10^{-2}

10^{-4}

10^{-3}

Obstacle volume ratio c

2σcsim/μ(T)

Verification of Friedelσ_c ∝ c^{1/2} scaling law for Cu at T=300K, a=10, K/2ε=0.1

theoretical prediction