0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 x 10^{-4} 0

0.5

1

1.5

2

2.5

3

3.5

4

4.5

5

Friedel theory prediction

2σ /μ(T) λ / (K/2 ε)-1/2L

Average free length on dislocation,λ , in Cu simulation at T=300K, a=10, c=0.001, K/2e=0.1