0 5 10 15 20 25 30 108

108.2

108.4

108.6

108.8

109

109.2

109.4

109.6

109.8

110

z [σ ]

T [K]

Temperature profile of 5184 Ar atoms avg. over 485000 steps (3880 ps)

Boundary OPC