Tougher Job : Demand to satisfy a distribution {x , v } i i specified by f (x,v) Continuum fields

on arbitrary boundary. ρ(x), v(x), T(x)

MD

vout but will

vin

Maxwell’sDemons vout

atom

resamplevout and ρ(x),v(x),T(x) using f vin may

∋

f

However for MD results to be e x a c t, atoms should evolve n a t u r a l l y without feeling any artificial disturbance. Is that possible ?